[[analysis-edgengram-tokenfilter]]
=== Edge NGram Token Filter

A token filter of type `edgeNGram`.

The following are settings that can be set for a `edgeNGram` token
filter type:

[cols="<,<",options="header",]
|======================================================
|Setting |Description
|`min_gram` |Defaults to `1`.
|`max_gram` |Defaults to `2`.
|`side` |Either `front` or `back`. Defaults to `front`.
|======================================================

