[[analysis-unique-tokenfilter]]
=== Unique Token Filter

The `unique` token filter can be used to only index unique tokens during
analysis. By default it is applied on all the token stream. If
`only_on_same_position` is set to `true`, it will only remove duplicate
tokens on the same position.
